(* Version 1.10, Nov 1984 *)
DEFINITION MODULE FileNames;
(*
   Read a file specification from the terminal.

Derived from the Lilith Modula-2 system developed by the
group of Prof. N. Wirth at ETH Zurich, Switzerland.
*)


EXPORT QUALIFIED
  FNParts, FNPartSet, ReadFileName;


TYPE
  FNParts   = (FNDrive, FNPath, FNName, FNExt);
  FNPartSet = SET OF FNParts; 


PROCEDURE ReadFileName(VAR resultFN: ARRAY OF CHAR;
                       defaultFN: ARRAY OF CHAR;
                       VAR ReadInName: FNPartSet);
(*
- Read a file specification from terminal.

in:     defaultFN       default file specification,
out:    resultFN        the file specification read,
        ReadInName      which parts are in specification.

Reads until a <cr>, blank, <can>, or <esc> is typed.
After a call to ReadFileName, Terminal.Read must be called
to read the termination character. The format of the
specification depends on the host operating system.
*)


END FileNames.
